<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">%% 
%%  A DANTE-Edition example
%% 
%%  Example 02-20-2 on page 93.
%% 
%%  Copyright (C) 2010 Herbert Voss
%% 
%%  It may be distributed and/or modified under the conditions
%%  of the LaTeX Project Public License, either version 1.3
%%  of this license or (at your option) any later version.
%% 
%%  See http://www.latex-project.org/lppl.txt for details.
%% 
%% 
%% ==== 
% Show page(s) 1
%% 
\documentclass[]{article}
\pagestyle{empty}
\setlength\textwidth{201.70511pt}
\setlength\parindent{0pt}
\usepackage[english]{babel}
\usepackage[utf8]{inputenc}

\usepackage[para]{threeparttable}

\begin{document}
\begin{threeparttable} \caption{Different gas analyses.}
\begin{tabular}[t]{r|c|c|c}\hline
               &amp; P1             &amp; P2\tnote{A} &amp; P3\\\hline
decrease in pressure    &amp; 0.149 &amp; 0.494 &amp; 0.199 \\
winding        &amp; 0.146          &amp; 0.480 &amp; 0.240 \\
heat extraction &amp; 0.164\tnote{a} &amp; 0.508 &amp; 0.209 \\\hline
\end{tabular}
\begin{tablenotes}[flushleft]
  \item[A] uncertain measurement \item[a] disturbance during measurement
\end{tablenotes}
\end{threeparttable}
\end{document}
</pre></body></html>