<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\begin{pspicture}(-2,-2)(3.5,2)\psset{CodeFig=true, unit=.75}\psgrid
  \input{Exemples/orthocentre_in}
\end{pspicture}
</pre></body></html>